<script setup lang="ts">
import type { NdmSwitchDiagInfo, NdmSwitchPortInfo } from '@/apis/domains';
import type { NdmSwitchResultVO, PageParams } from '@/apis/models';
import { postSnmpLogPage } from '@/apis/requests';
import { getPortStatusVal, transformPortSpeed } from '@/components/helper';
import { useMutation } from '@tanstack/vue-query';
import dayjs from 'dayjs';
import destr from 'destr';
import { NButton, NCard, NDataTable, NModal, type DataTableColumns, type DataTableRowData, type DatePickerProps, type PaginationProps } from 'naive-ui';
import { h, reactive, ref, toRefs } from 'vue';

const props = defineProps<{
  stationCode: string;
  ndmSwitch: NdmSwitchResultVO;
  dateTimeRange: DatePickerProps['value'];
}>();

const { stationCode, ndmSwitch, dateTimeRange } = toRefs(props);

const modalShow = ref(false);

const modalTableColumns: DataTableColumns<NdmSwitchPortInfo> = [
  { title: '端口名称', key: 'portName' },
  {
    title: '状态',
    key: 'upDown',
    render(rowData) {
      return getPortStatusVal(rowData);
    },
  },
  {
    title: '上行速率',
    key: 'inFlow',
    render(rowData) {
      return transformPortSpeed(rowData, 'in');
    },
  },
  {
    title: '下行速率',
    key: 'outFlow',
    render(rowData) {
      return transformPortSpeed(rowData, 'out');
    },
  },
  {
    title: '总速率',
    key: 'totalFlow',
    render(rowData) {
      return transformPortSpeed(rowData, 'total');
    },
  },
];

const modalTableData = ref<DataTableRowData[]>([]);

type SwitchPortRowData = {
  createdTime: string;
  diagInfo: NdmSwitchDiagInfo;
};

const tableColumns: DataTableColumns<SwitchPortRowData> = [
  { title: '诊断时间', key: 'createdTime' },
  {
    title: '超载端口',
    key: 'overFlowPorts',
    render(rowData) {
      const { diagInfo } = rowData;
      const { info } = diagInfo;
      const { overFlowPorts } = info;
      return h('pre', {}, { default: () => overFlowPorts.join('\n') });
    },
  },
  {
    title: '操作',
    key: 'action',
    render(rowData) {
      return h(
        NButton,
        {
          text: true,
          type: 'info',
          onClick: () => {
            const { diagInfo } = rowData;
            if (!diagInfo) return;
            modalShow.value = true;
            console.log('查看', diagInfo);
            modalTableData.value = diagInfo.info.portInfoList;
          },
        },
        { default: () => '查看' },
      );
    },
  },
  //
];

const tableData = ref<DataTableRowData[]>([]);
const DEFAULT_PAGE_SIZE = 10;
const pagination = reactive<PaginationProps>({
  size: 'small',
  showSizePicker: true,
  page: 1,
  pageSize: DEFAULT_PAGE_SIZE,
  pageSizes: [5, 10, 20, 50, 80, 100],
  itemCount: 0,
  prefix: ({ itemCount }) => {
    return h('div', {}, { default: () => `共${itemCount}条` });
  },
  onUpdatePage: (page) => {
    pagination.page = page;
    getDeviceSnmpLogList();
  },
  onUpdatePageSize: (pageSize) => {
    pagination.pageSize = pageSize;
    pagination.page = 1;
    getDeviceSnmpLogList();
  },
});

const { mutate: getDeviceSnmpLogList, isPending } = useMutation({
  mutationFn: async () => {
    if (!dateTimeRange.value) throw new Error('请选择时间范围');
    const range = dateTimeRange.value as [number, number];
    const deviceId = ndmSwitch.value.id;
    const createdTime_precisest = dayjs(range[0]).format('YYYY-MM-DD HH:mm:ss');
    const createdTime_preciseed = dayjs(range[1]).format('YYYY-MM-DD HH:mm:ss');
    const restParams: Omit<PageParams<{ id: string }>, 'model' | 'extra'> = {
      current: pagination.page ?? 1,
      size: pagination.pageSize ?? DEFAULT_PAGE_SIZE,
      sort: 'id',
      order: 'descending',
    };
    const respData = await postSnmpLogPage(stationCode.value, {
      model: { deviceId },
      extra: { createdTime_precisest, createdTime_preciseed },
      ...restParams,
    });
    return respData;
  },
  onSuccess: ({ records, size, total }) => {
    pagination.pageSize = parseInt(size);
    pagination.itemCount = parseInt(total);
    tableData.value = records.map((record) => {
      const diagInfoJsonString = record.diagInfo;
      const diagInfo = destr<NdmSwitchDiagInfo>(diagInfoJsonString);
      if (!diagInfo) return {};
      if (typeof diagInfo !== 'object') return {};
      return {
        createdTime: record.createdTime,
        diagInfo,
      };
    });
  },
  onError: (error) => {
    console.error(error);
    window.$message.error(error.message);
  },
});

defineExpose({
  isPending,
  refresh: () => {
    pagination.page = 1;
    pagination.pageSize = DEFAULT_PAGE_SIZE;
    getDeviceSnmpLogList();
  },
});
</script>

<template>
  <NCard size="small" title="端口历史记录">
    <NDataTable size="small" :loading="isPending" :columns="tableColumns" :data="tableData" :pagination="pagination" :single-line="false" remote flex-height style="height: 500px" />
  </NCard>
  <NModal
    v-model:show="modalShow"
    :preset="'card'"
    :auto-focus="false"
    :transform-origin="'center'"
    :content-style="{
      height: '100%',
    }"
    style="min-width: 1400px; height: 100vh"
  >
    <NDataTable size="small" :columns="modalTableColumns" :data="modalTableData" :single-line="false" :remote="false" flex-height style="height: 100%" />
  </NModal>
</template>

<style scoped></style>
